Scheduling for Modern Disk Drives and Non-Random Workloads by Bruce L. Worthington, Gregory R. Ganger, Yale N. Patt CSE-TR-194-94

Computer Science and Engineering Division Room 3402 EECS Building

UNIVERSITY OF MICHIGAN

Department of Electrical Engineering and Computer Science Ann Arbor, Michigan 48109-2122 USA